From 07e2b64c03c2fb566f324310f89b88797881b039 Mon Sep 17 00:00:00 2001
From: "Adam T. Carpenter" <atc@53hor.net>
Date: Fri, 11 Sep 2020 17:11:46 -0400
Subject: reset admin page to basic template

---
 iridescence/src/views/Admin.vue | 6 +-----
 1 file changed, 1 insertion(+), 5 deletions(-)

(limited to 'iridescence/src/views/Admin.vue')

diff --git a/iridescence/src/views/Admin.vue b/iridescence/src/views/Admin.vue
index a14cc7f..53c5417 100644
--- a/iridescence/src/views/Admin.vue
+++ b/iridescence/src/views/Admin.vue
@@ -1,12 +1,8 @@
 <template>
-  <div class="home">
-    <img alt="Vue logo" src="../assets/logo.png" />
-  </div>
+  <h1>this is an admin page</h1>
 </template>
 
 <script>
-// @ is an alias to /src
-
 export default {
   name: "Admin",
   components: {}
-- 
cgit v1.2.3

